Tagger Energy (GeV)

0.2 0.3 0.4 0.5 0.6

(ns) L-R σ

0.26

0.28 0.3 0.32

0.34

0.36

0.38

Time difference resolution at z=0cm (ts7-tn7)

0.005 ) ns ± ( 0.210 ⊕ E 0.003 ± 0.132

Preliminary