Start Counter Plots

1 MC sample containing a single photon per event

• The following parameters were set in the control.in file :

BEAM 12. 9. 0.0012 where the third parameter defines a threshold on the minimal bremsstrahlung energy. BGRATE 11.0 TRIG 10000000 Hit rate is 2.23 kHz

2 Energy Loss Distribution

3 Hits per paddle