0 0.2 0.4 0.6 0.8 1 1

10

210

310 E1200 T20 - R0_{Entries 100000}

Mean 0.0005011 ± 0.3599

RMS 0.0003544 ± 0.1585

E1200 T20 - R0

0 0.2 0.4 0.6 0.8 1 1

10

210

310 (E650+E550)T20R0_{Entries 100000}

Mean 0.0004171 ± 0.4409

RMS 0.0002949 ± 0.1319

(E650+E550)T20R0

0 0.2 0.4 0.6 0.8 1 1

10

210

310 E1200 T20 - R1_{Entries 100000}

Mean 0.000411 ± 0.5401

RMS 0.0002906 ± 0.13

E1200 T20 - R1

0 0.2 0.4 0.6 0.8 1 1

10 210

310 (E650+E550)T20R1_{Entries 100000}

Mean 0.0003574 ± 0.4772

RMS 0.0002527 ± 0.113

(E650+E550)T20R1

0 0.2 0.4 0.6 0.8 1 1 10 210 310

E1200 T20 - R2_{Entries 100000}

Mean 0.0002018 ± 0.09094

RMS 0.0001427 ± 0.06381

E1200 T20 - R2

0 0.2 0.4 0.6 0.8 1 1 10 210 310 410 (E650+E550)T20R2_{Entries 100000}

Mean 0.0001427 ± 0.07406

RMS 0.0001009 ± 0.04513

(E650+E550)T20R2

0 0.2 0.4 0.6 0.8 1 1 10 210 310 410 E1200 T20 - R3_{Entries 100000}

Mean 3.03e-05 ± 0.008984

RMS 2.143e-05 ± 0.009582

E1200 T20 - R3

0 0.2 0.4 0.6 0.8 1 1 10 210 310 410 (E650+E550)T20R3_{Entries 100000}

Mean 2.661e-05 ± 0.007819

RMS 1.882e-05 ± 0.008416

(E650+E550)T20R3