0 0.2 0.4 0.6 0.8 1 1 10 210 310 410 E1000 T90 - R0_{Entries 100000}

Mean 0.0001268 ± 0.03756

RMS 8.969e-05 ± 0.04011

E1000 T90 - R0

0 0.2 0.4 0.6 0.8 1 1 10 210 310 410 (E600+E400)T90R0_{Entries 100000}

Mean 0.000144 ± 0.06125

RMS 0.0001018 ± 0.04553

(E600+E400)T90R0

0 0.2 0.4 0.6 0.8 1 1 10 210 310 E1000 T90 - R1_{Entries 100000}

Mean 0.0004327 ± 0.2911

RMS 0.0003059 ± 0.1368

E1000 T90 - R1

0 0.2 0.4 0.6 0.8 1 1

10 210

310 (E600+E400)T90R1_{Entries 100000}

Mean 0.0003561 ± 0.3531

RMS 0.0002518 ± 0.1126

(E600+E400)T90R1

0 0.2 0.4 0.6 0.8 1 1

10 210

310 E1000 T90 - R2_{Entries 100000}

Mean 0.0003453 ± 0.4454

RMS 0.0002442 ± 0.1092

E1000 T90 - R2

0 0.2 0.4 0.6 0.8 1 1 10 210 310 (E600+E400)T90R2_{Entries 100000}

Mean 0.0003102 ± 0.4093

RMS 0.0002193 ± 0.09808

(E600+E400)T90R2

0 0.2 0.4 0.6 0.8 1 1

10

210

310 E1000 T90 - R3_{Entries 100000}

Mean 0.0004302 ± 0.2259

RMS 0.0003042 ± 0.136

E1000 T90 - R3

0 0.2 0.4 0.6 0.8 1 1 10 210 310 (E600+E400)T90R3_{Entries 100000}

Mean 0.0003016 ± 0.1763

RMS 0.0002132 ± 0.09537

(E600+E400)T90R3