-0.8

-0.7

-0.6

-0.5

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

-0.8

-0.7

-0.6

-0.5

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 Electron drift lines from a track

x-Axis ΜcmΝ y-Axis ΜcmΝ

Gasϑ Ar 87Ψ, CO_2 13Ψ, T=300 K, p=1 atm

Particleϑ 20 equally spaced points

-0.8

-0.7

-0.6

-0.5

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

0.02

0.04

0.06

0.08 0.1 0.12

0.14

0.16

0.18 0.2 0.22

x(t)-Correlation plot

x-Distance from the Wire ΜcmΝ

Minimum Drift Time ΜμsecΝ

Gasϑ Ar 87Ψ, CO_2 13Ψ, T=300 K, p=1 atm

Angle to y = 0.00 degrees Wire no = 1 (type S)